.

file:/starsrus.as.arizona.edu/BIG/SPIE/TAIMAGES.CANV G. Schneider, 3/11/1998

050100150200250300350-300-200-1000100200300(Xoff = -0.05pix, Yoff=+0.02pix)

Bin Width = 5.85 ADU

Flux-Scaled Reference PSF SubtractionXoff = -0.05pix, Yoff= +0.02pix

Number of Pixels (841 total)

ADU / Second

(Xoff = +0.07pix, Yoff=+0.14pix)

Bin Width = 20.7 ADU

Subtraction of two identically exposed and reduced coronagraphicimages of the same target (805-06). The field was rotated 30 degreesabout the target star between observations. The differential pointingerror resulted in a mis-registartion of the target in the coronagraphichole by 0.16 pixel (with an absolute pointing error of ~1.3 pixels).

Subtraction of the "positive roll" image of the same target (805)using a much better position-matched flux-scaled PSF (S62). Theregistration of the two PSF cores in was three times better then theroll-subtraction shown on the left. (The large dark spot below thetarget is a moderately bright field star in the reference PSF image).