0481216202428320.00.20.40.60.81.01.21.41.61.82.02.22.42.62.83.03.2MAGNITUDE DIFFERENCE

N umbe r of

D ouble sMagnitudes

02468101214160100200300400500600700800900100011001200COMPONENT SEPARATION

N umbe r of

D ouble sSeparation in M.A.S.